<template>
    <v-layout>
        <v-flex xs12>
            <v-card class="mb-2" color="white">
                <v-toolbar color="blue lighten-3" dark height="50px">
                    <v-toolbar-title>INSTRUMEN [{{xcontrol.name}}]</v-toolbar-title>
                    <v-spacer></v-spacer>
                    <v-btn v-if="xcontrol.name != 'Belum Pilih Control'" @click="openFormInstrument(0)" icon>
                        <v-icon>library_add</v-icon>
                    </v-btn>
                    <v-icon v-if="xcontrol.name != 'Belum Pilih Control'" style="color:white" @click="simpanAll()">save</v-icon>
                </v-toolbar>
                <v-layout row style="background:#bbdefb;padding-top:5px;" justify-left>
                    <v-list-tile>
                        <input type="text" @click="selectMe(0)" v-model="xsearch" class="textinput" label="Nama Station" placeholder="Cari ..." />
                        </v-list-tile-content>
                    </v-list-tile>
                </v-layout>
                <v-divider></v-divider>
                <v-layout row wrap class="scroll-container" style="max-height:600px;overflow: auto;">
                    <v-flex xs12 pl-2 pr-2 pt-2 pb-2>
                        <v-data-table :headers="headers" :items="instruments" :loading="isLoading" hide-actions class="elevation-1">
                            <template slot="items" slot-scope="props">
                                <td class="text-xs-left pa-2" v-bind:class="{'amber lighten-4':isSelected(props.item)}" @click="selectMe(props.item)">{{ props.item.Nat_InstrumentName}}
                                    <p style="color:#800000" class="mb-0 font-weight-bold caption">{{props.item.Nat_QcControlName}}</p>
                                </td>
                                <td class="text-xs-left pa-2" v-bind:class="{'amber lighten-4':isSelected(props.item)}" @click="selectMe(props.item)">{{ props.item.Nat_QcLevelName}}
                                    <p style="color:#800000" class="mb-0 font-weight-bold caption">{{props.item.Nat_QcControlLotNumber}} | {{props.item.expdate}}</p>
                                </td>
                                <td class="text-xs-left pa-2" v-bind:class="{'amber lighten-4':isSelected(props.item)}" @click="selectMe(props.item)">
                                    <p v-if="xcontrol.name == 'Belum Pilih Control'" style="color:black" class="mb-0 font-weight-bold caption">{{props.item.Nat_QcInstrumentQcCode}}</p>
                                    <v-text-field v-on:change="changeQc" v-if="xcontrol.name != 'Belum Pilih Control'" style="margin-top:0;padding-top:0" v-model="props.item.Nat_QcInstrumentQcCode"
                                        hide-details></v-text-field>
                                </td>
                                <td class="text-xs-left pa-2" v-bind:class="{'amber lighten-4':isSelected(props.item)}" @click="selectMe(props.item)">
                                    <v-icon v-if="xcontrol.name != 'Belum Pilih Control'" small class="ml-3" color="error" @click="deleteFormInstrument(props.item)">clear</v-icon>
                                </td>
                            </template>
                        </v-data-table>
                    </v-flex>
                </v-layout>
                <v-divider></v-divider>
                <v-pagination style="margin-top:10px;margin-bottom:10px" v-model="curr_page" :length="xtotal_page"></v-pagination>

                <template>
                    <v-layout row justify-center>
                        <v-dialog v-model="dialoginstrument" persistent max-width="750px">
                            <v-card>
                                <v-card-title>
                                    <span class="headline">FORM INSTRUMEN</span>
                                </v-card-title>
                                <v-card-text class="pt-0 pb-0">
                                    <v-form ref="formcontrolinstrument" v-model="validinstrument" lazy-validation>
                                        <v-layout wrap>
                                            <v-flex xs12>
                                                <v-layout>
                                                    <v-flex xs7 pa-1>
                                                        <v-autocomplete label="Instrumen" v-model="xorderautoinstrument" :items="xorderautoinstruments" :search-input.sync="search_instrument"
                                                            auto-select-first no-filter item-text="Nat_InstrumentName" return-object
                                                            no-data-text="Cari Instrumen" outline small>
                                                            <template slot="item" slot-scope="{ item }">
                                                                <v-list-tile-content>
                                                                    <v-list-tile-title v-text="item.Nat_InstrumentName"></v-list-tile-title>
                                                                </v-list-tile-content>
                                                            </template>
                                                        </v-autocomplete>
                                                    </v-flex>
                                                    <v-flex xs5 pa-1>
                                                        <v-btn @click="addInstrument()" color="blue en-3">Tambah</v-btn>
                                                    </v-flex>
                                                </v-layout>

                                            </v-flex>
                                            <v-flex xs4 v-for="(vst,idx) in xorderinstruments" :key="vst.Nat_InstrumentID" class="pr-2 pb-1">
                                                <v-layout row>
                                                    <v-flex class="boxoutline" style="text-overflow:ellipsis;overflow:hidden;" xs11>
                                                        <v-btn class="ml-4" large @click="deleteDataPx(idx)" color="error">
                                                            <v-icon left>close</v-icon>{{vst.Nat_InstrumentName}}</v-btn>
                                                    </v-flex>
                                                </v-layout>
                                            </v-flex>
                                            <v-flex>
                                                <p v-for="(xerror,idx) in xerrors" class="error pl-2 pr-2" style="color:#fff">{{xerror.msg}}</p>
                                            </v-flex>
                                        </v-layout>
                                </v-card-text>
                                <v-card-actions>
                                    <v-spacer></v-spacer>
                                    <v-btn color="blue darken-1" flat @click="updateDialogFormInstrument()">Tutup</v-btn>
                                    <v-btn color="blue darken-1" flat @click="saveFormInstrument()">Simpan</v-btn>
                                </v-card-actions>
                                </v-form>
                            </v-card>
                        </v-dialog>
                    </v-layout>
                </template>

            </v-card>
        </v-flex>

        <one-dialog-print :title="printtitle" :width="printwidth" :height="500" :status="openprint" :urlprint="urlprint" @close-dialog-print="closePrint"></one-dialog-print>
        <template>

            <v-dialog v-model="dialogdeletealertinstrument" max-width="30%">
                <v-card>
                    <v-card-title class="headline grey lighten-2 pt-2 pb-2" primary-title>
                        Peringatan !
                    </v-card-title>
                    <v-card-text class="pt-2 pb-2">
                        <v-layout row>
                            <v-flex xs12 d-flex>
                                <v-layout row>
                                    <v-flex pb-1 xs12>
                                        <v-layout row>
                                            <v-flex pt-2 pr-2 xs12>
                                                {{msgalertinstrument}}
                                            </v-flex>
                                        </v-layout>
                                    </v-flex>
                                </v-layout>
                            </v-flex>
                        </v-layout>
                    </v-card-text>
                    <v-divider></v-divider>
                    <v-card-actions>
                        <v-spacer></v-spacer>
                        <v-btn color="primary" flat @click="dialogdeletealertinstrument = false">
                            Tutup
                        </v-btn>
                        <v-btn color="primary" flat @click="closeDeleteAlertInstrument()">
                            Yakin lah
                        </v-btn>
                    </v-card-actions>
                </v-card>
            </v-dialog>

        </template>
        <one-dialog-alert :status="openalertconfirmation" :msg="msgalertconfirmation" @forget-dialog-alert="forgetAlertConfirmation()"
            @close-dialog-alert="closeAlertConfirmation()"></one-dialog-alert>
    </v-layout>
</template>

<style scoped>
    .searchbox .v-input.v-text-field .v-input__slot {
        min-height: 60px;
    }

    .searchbox .v-btn {
        min-height: 60px;
    }

    table.v-table tbody td,
    table.v-table tbody th {
        height: 40px;
    }

    table.v-table thead tr {
        height: 40px;
    }

    .textinput {
        -webkit-transition: width 0.4s ease-in-out;
        transition: width 0.4s ease-in-out;
        background-color: white;
        background-position: 10px 10px;
        background-repeat: no-repeat;
        padding-left: 40px;
        width: 100%;
        padding: 8px 10px;
        margin-bottom: 5px;
        box-sizing: border-box;
        border: 1px solid #607d8b;

    }

    .textinput:focus {
        width: 100%;
    }

    .textinput:focus::-webkit-input-placeholder {
        color: transparent;
    }

    .textinput:focus::-moz-placeholder {
        color: transparent;
    }

    .textinput:-moz-placeholder {
        color: transparent;
    }

    .boxoutline {
        color: red;
        border: 1px solid red;
        justify-content: center;
        height: 45px;
        line-height: 45px;
        padding-left: 10px;
        background: #ffffff;
        font-size: 14px;
        font-weight: 500;
        border-radius: 1px
    }

    .boxoutline:hover {
        background: rgba(0, 0, 0, 0.07) !important;
        font-size: 15px;
        font-weight: 700;
    }

    .boxsolid {
        color: #ffffff;
        border: 1px solid #ffffff;
        justify-content: center;
        height: 45px;
        line-height: 45px;
        padding-left: 10px;
        background: #f44336;
        font-size: 14px;
        font-weight: 500;
        border-radius: 1px
    }

    .boxsolid:hover {
        background: #f44336de;
        font-size: 15px;
        font-weight: 700;
    }

    .scroll-container {
        scroll-padding: 50px 0 0 50px;
    }

    ::-webkit-scrollbar {
        width: 7px;
    }

    /* this targets the default scrollbar (compulsory) */

    ::-webkit-scrollbar-track {
        background-color: #73baf3;
    }

    /* the new scrollbar will have a flat appearance with the set background color */

    ::-webkit-scrollbar-thumb {
        background-color: #2196f3;
    }

    /* this will style the thumb, ignoring the track */

    ::-webkit-scrollbar-button {
        background-color: #0079da;
    }

    /* optionally, you can style the top and the bottom buttons (left and right for horizontal bars) */

    ::-webkit-scrollbar-corner {
        background-color: black;
    }

    /* if both the vertical and the horizontal bars appear, then perhaps the right bottom corner also needs to be styled */
</style>

<script>
    module.exports = {
        components: {
            'one-date-picker': httpVueLoader('../../../common/oneDatePicker.vue'),
            'one-dialog-print': httpVueLoader('../../../common/oneDialogPrintX.vue'),
            'one-dialog-alert': httpVueLoader('../../../common/oneDialogAlert.vue')
        },
        data() {
            return {
                query: "",
                items: [],
                msgalertconfirmation: "Perubahan yang telah dilakukan belum disimpan dong !",
                openprint: false,
                urlprint: '',
                printtitle: '',
                printwidth: 600,
                formatreport: 'pdf',
                readonlydefault: false,
                page: 1,
                xname: '',
                xphone: '',
                xcode: '',
                xdescription: '',
                xipdescription: '',
                xbasename: '',
                isdefault: false,
                issatellite: false,
                search_control: '',
                search_city: '',
                search_district: '',
                search_kelurahan: '',
                search_company: '',
                search_mou: '',
                search_doctor: '',
                search_instrument: '',
                xnameRules: [
                    v => !!v || 'Nama harus diisi'
                ],
                xcodeRules: [
                    v => !!v || 'Kode harus diisi'
                ],
                descriptionRules: [
                    v => !!v || 'Alamat harus diisi'
                ],
                xipdescriptionRules: [
                    v => !!v || 'Alamat IP harus diisi'
                ],
                controlRules: [
                    v => !!v || 'Control harus dipilih'
                ],
                cityRules: [
                    v => !!v || 'Kota harus dipilih'
                ],
                districtRules: [
                    v => !!v || 'Kecamatan harus dipilih'
                ],
                kelurahanRules: [
                    v => !!v || 'Kelurahan harus dipilih'
                ],
                headers: [{
                        text: "NAMA",
                        align: "left",
                        sortable: false,
                        value: "name",
                        width: "20%",
                        class: "blue lighten-3 white--text"
                    },
                    {
                        text: "DETAIL",
                        align: "left",
                        sortable: false,
                        value: "status",
                        width: "20%",
                        class: "blue lighten-3 white--text"
                    },
                    {
                        text: "KODE QC",
                        align: "left",
                        sortable: false,
                        value: "status",
                        width: "10%",
                        class: "blue lighten-3 white--text"
                    },
                    {
                        text: "AKSI",
                        align: "left",
                        sortable: false,
                        value: "name",
                        width: "10%",
                        class: "blue lighten-3 white--text"
                    }
                ],
                pagination: {
                    descending: false,
                    page: 1,
                    rowsPerPage: 100,
                    sortBy: 'Nat_InstrumentName ASC',
                    totalItems: this.$store.state.instrument.total_transactions
                },
                statuss: [{
                        waktu: '16-07-2019 10:00',
                        status: 'Order Dibuat',
                        instrument: 'Nagita Slavina'
                    },
                    {
                        waktu: '16-07-2019 11:00',
                        status: 'Order Dikirim',
                        instrument: 'Nagita Slavina'
                    },
                    {
                        waktu: '16-07-2019 12:00',
                        status: 'Order dikonfirmasi',
                        instrument: 'Chacha Frederica'
                    },
                    {
                        waktu: '16-07-2019 13:00',
                        status: 'Telah dibuat Surat Jalan',
                        instrument: 'Chacha Frederica'
                    },
                    {
                        waktu: '16-07-2019 14:00',
                        status: 'Kurir akan mengambil sampel',
                        instrument: 'Satria Subiantoro'
                    }
                ],
                color: "success",
                validinstrument: false,
                xid: 0,
                isinput: "N",
                countprice: 0,
                instrumentinstrumentid: 0,
                instrumentxname: "",
                instrumentlang: "",
                instrumenttext: "",
                isadvance: "N",
                instrumentformatadvance: "",
                issenttocontrol: "N",
                menustartdate: false,
                menuenddate: false,
                date: new Date().toISOString().substr(0, 10),

                dialogdeletealertinstrument: false,
                dialogverifyalertinstrument: false,
                dialogreleasealertinstrument: false,
                alertverify: false,
                dialogunreleasealertinstrument: false,
                dialogunverifyalertinstrument: false,
                msgalertinstrument: ""
            };
        },
        mounted() {
            this.$store.dispatch("instrument/lookupbyname", {
                control: this.$store.state.control.x_search,
                instrument: this.xsearch,
                qc: this.$store.state.qc.x_search,
                current_page: 1,
                lastid: -1
            })
        },
        computed: {
            instruments() {
                return this.$store.state.instrument.instruments
            },
            xcontrol() {
                return this.$store.state.control.selected_control
            },
            xorderintruments() {
                return this.$store.state.control.orderinstruments
            },
            dialoginstrument() {
                return this.$store.state.instrument.dialog_form_instrument
            },
            xerrors() {
                return this.$store.state.instrument.errors
            },
            isLoading() {
                return this.$store.state.instrument.search_status == 1
            },
            startComputedDateFormatted() {
                return this.formatDate(this.xstartdate)
            },
            xstartdate: {
                get() {
                    return this.$store.state.instrument.startdate
                },
                set(val) {
                    this.$store.commit("instrument/update_startdate", val)
                }
            },
            endComputedDateFormatted() {
                return this.formatDate(this.xenddate)
            },
            xenddate: {
                get() {
                    return this.$store.state.instrument.enddate
                },
                set(val) {
                    this.$store.commit("instrument/update_enddate", val)
                }
            },
            xautocitys() {
                return this.$store.state.instrument.autocitys
            },
            xautocity: {
                get() {
                    return this.$store.state.instrument.autocity
                },
                set(val) {
                    this.$store.commit("instrument/update_autocity", val)
                    this.$store.dispatch("instrument/searchdistrict", {
                        search: this.search_district,
                        id: val.M_CityID
                    })
                }
            },
            xautodistricts() {
                return this.$store.state.instrument.autodistricts
            },
            xautodistrict: {
                get() {
                    return this.$store.state.instrument.autodistrict
                },
                set(val) {
                    this.$store.commit("instrument/update_autodistrict", val)
                    this.$store.dispatch("instrument/searchkelurahan", {
                        search: this.search_kelurahan,
                        id: val.M_DistrictID
                    })
                }
            },
            xautokelurahans() {
                return this.$store.state.instrument.autokelurahans
            },
            xautokelurahan: {
                get() {
                    return this.$store.state.instrument.autokelurahan
                },
                set(val) {
                    this.$store.commit("instrument/update_autokelurahan", val)
                }
            },
            xautocompanys() {
                return this.$store.state.instrument.autocompanys
            },
            xautocompany: {
                get() {
                    return this.$store.state.instrument.autocompany
                },
                set(val) {
                    this.$store.commit("instrument/update_autocompany", val)
                    this.$store.dispatch("instrument/searchmou", {
                        search: this.search_mou,
                        id: val.M_CompanyID
                    })
                }
            },
            xautomous() {
                return this.$store.state.instrument.automous
            },
            xautomou: {
                get() {
                    return this.$store.state.instrument.automou
                },
                set(val) {
                    this.$store.commit("instrument/update_automou", val)
                }
            },
            xautodoctors() {
                return this.$store.state.instrument.autodoctors
            },
            xautodoctor: {
                get() {
                    return this.$store.state.instrument.autodoctor
                },
                set(val) {
                    this.$store.commit("instrument/update_autodoctor", val)
                    this.$store.dispatch("instrument/selectdescriptiondoctor", {
                        id: val.M_DoctorID
                    })
                }
            },
            xdescriptiondoctors() {
                return this.$store.state.instrument.descriptiondoctors
            },
            xdescriptiondoctor: {
                get() {
                    return this.$store.state.instrument.descriptiondoctor
                },
                set(val) {
                    this.$store.commit("instrument/update_descriptiondoctor", val)
                }
            },
            xstatuss() {
                return this.$store.state.instrument.statuss
            },
            dialogstatusorder() {
                return this.$store.state.instrument.dialog_status_order
            },
            xautocontrols() {
                return this.$store.state.instrument.autocontrols
            },
            xautocontrol: {
                get() {
                    return this.$store.state.instrument.autocontrol
                },
                set(val) {
                    this.$store.commit("instrument/update_autocontrol", val)
                }
            },
            xorderautoinstruments() {
                return this.$store.state.instrument.orderautoinstruments
            },
            xorderautoinstrument: {
                get() {
                    return this.$store.state.instrument.orderautoinstrument
                },
                set(val) {
                    this.$store.commit("instrument/update_orderautoinstrument", val)
                }
            },
            xorderinstruments() {
                return this.$store.state.instrument.orderinstruments
            },
            no_save: {
                get() {
                    return this.$store.state.instrument.no_save
                },
                set(val) {
                    this.$store.commit("instrument/update_no_save", val)
                }
            },
            openalertconfirmation: {
                get() {
                    return this.$store.state.instrument.open_alert_confirmation
                },
                set(val) {
                    this.$store.commit("instrument/update_open_alert_confirmation", val)
                }
            },
            xsearch: {
                get() {
                    return this.$store.state.instrument.x_search
                },
                set(val) {
                    this.$store.commit("instrument/update_x_search", val)
                }
            },
            curr_page: {
                get() {
                    return this.$store.state.instrument.current_page
                },
                set(val) {
                    if (this.$store.state.instrument.no_save == 0) {
                        if (this.xcontrol.name == 'Belum Pilih Control') {
                            this.$store.commit("instrument/update_current_page", val)
                            this.$store.dispatch("instrument/lookupbyname", {
                                control: this.$store.state.qc.x_search,
                                qc: this.$store.state.instrument.x_search,
                                instrument: this.xsearch,
                                current_page: val,
                                lastid: -1
                            })
                        } else {
                            this.$store.commit("instrument/update_current_page", val)
                            this.$store.dispatch("instrument/lookupbyid", {
                                id: this.$store.state.control.selected_control.id,
                                instrument: this.xsearch,
                                current_page: 1,
                                lastid: -1
                            })
                        }
                    } else {
                        this.$store.commit("instrument/update_open_alert_confirmation", true)
                    }
                }
            },
            xtotal_page: {
                get() {
                    return this.$store.state.instrument.total_data
                },
                set(val) {
                    this.$store.commit("instrument/update_total_data", val)
                }
            }
        },
        methods: {
            isSelected(p) {
                return p.id == this.$store.state.instrument.selected_instrument.id
            },
            selectMe(sc) {
                if (this.$store.state.qc.no_save == 0) {
                    if (sc == '0' && this.xcontrol.name == 'Belum Pilih Control') {
                        this.$store.commit("instrument/update_selected_instrument", {
                            name: "Belum Pilih Instrument"
                        })
                        this.$store.commit("qc/update_selected_qc", {
                            name: ""
                        })

                        this.$store.dispatch("control/lookupbyname", {
                            control: this.$store.state.control.x_search,
                            instrument: this.xsearch,
                            qc: this.$store.state.qc.x_search,
                            current_page: 1,
                            lastid: -1
                        })
                        this.$store.dispatch("instrument/lookupbyname", {
                            control: this.$store.state.control.x_search,
                            qc: this.$store.state.qc.x_search,
                            instrument: this.xsearch,
                            current_page: 1,
                            lastid: -1
                        })
                        this.$store.dispatch("qc/lookupbyname", {
                            control: this.$store.state.control.x_search,
                            qc: this.$store.state.qc.x_search,
                            instrument: this.xsearch,
                            current_page: 1,
                            lastid: -1
                        })
                    } else {
                        this.$store.commit("instrument/update_selected_instrument", sc)
                        this.$store.dispatch("qc/lookupbyid", {
                            instrumentid: this.$store.state.instrument.selected_instrument.Nat_QcNat_InstrumentID,
                            controlid: this.$store.state.instrument.selected_instrument.Nat_QcNat_QcControlID,
                            px: this.$store.state.qc.x_search,
                            current_page: 1,
                            lastid: -1
                        })
                        this.$store.commit("qc/update_selected_qc", {
                            name: ""
                        })
                    }
                } else {
                    this.$store.commit("qc/update_open_alert_confirmation", true)
                }


            },
            updateDialogFormInstrument() {
                this.$store.commit("instrument/update_dialog_form_instrument", false)
            },
            updateDialogStatusOrder() {
                this.$store.commit("instrument/update_dialog_status_order", false)
            },
            setStatusOrder(val) {
                this.$store.commit("instrument/update_instruments", {})
                this.$store.commit("instrument/update_dialog_status_order", true)
                this.$store.commit("instrument/update_statuss", val.statuss)
            },
            addInstrument() {
                var oldArr = this.$store.state.instrument.orderinstruments
                oldArr.push(this.$store.state.instrument.orderautoinstrument)
                this.searchinstrument = ''
                this.$store.commit("instrument/update_orderautoinstruments", [])
                this.$store.commit("instrument/update_orderautoinstrument", {})
            },
            deleteDataPx(idx) {
                var inx = parseInt(idx);
                var xrow = this.$store.state.instrument.orderinstruments[inx]
                if (parseInt(xrow.xid) !== 0) {
                    var xdeltest = this.$store.state.instrument.deleted_orderinstruments
                    xdeltest.push(xrow)
                    this.$store.commit("instrument/update_deleted_orderinstruments", xdeltest)
                }
                var oldArr = this.$store.state.instrument.orderinstruments
                oldArr.splice(inx, 1)
                this.$store.commit("instrumentqc/update_orderinstruments", oldArr)
            },
            doPriceList(val) {
                console.log(location)
                var id = val.id
                location.replace("/one-ui/control/vuex/one-md-price/" + "?id=" + id)
            },
            doPrice() {
                console.log(location)
                var id = this.xid
                location.replace("/one-ui/control/vuex/one-md-price/" + "?id=" + id)
            },
            thr_search_control: _.debounce(function () {
                this.$store.dispatch("instrument/searchcontrol", {
                    tes: this.search_control
                })
            }, 200),
            thr_search_instrument: _.debounce(function () {
                this.$store.dispatch("instrument/searchinstrument", {
                    search: this.search_instrument,
                    controlid: this.$store.state.control.selected_control.id,
                    instruments: this.xorderinstruments
                })
            }, 200),
            thr_search_city: _.debounce(function () {
                this.$store.dispatch("instrument/searchcity", {
                    search: this.search_city
                })
            }, 200),
            thr_search_district: _.debounce(function () {
                this.$store.dispatch("instrument/searchdistrict", {
                    search: this.search_district,
                    id: this.xautocity.M_CityID
                })
            }, 200),
            thr_search_kelurahan: _.debounce(function () {
                this.$store.dispatch("instrument/searchkelurahan", {
                    search: this.search_kelurahan,
                    id: this.xautodistrict.M_DistrictID
                })
            }, 200),
            thr_search: _.debounce(function () {
                this.$store.dispatch("control/lookupbyname", {
                    control: this.$store.state.control.x_search,
                    instrument: this.xsearch,
                    qc: this.$store.state.qc.x_search,
                    current_page: 1,
                    lastid: -1
                })
                this.$store.dispatch("instrument/lookupbyname", {
                    control: this.$store.state.control.x_search,
                    qc: this.$store.state.qc.x_search,
                    instrument: this.xsearch,
                    current_page: 1,
                    lastid: -1
                })
                this.$store.dispatch("qc/lookupbyname", {
                    control: this.$store.state.control.x_search,
                    qc: this.$store.state.qc.x_search,
                    instrument: this.xsearch,
                    current_page: 1,
                    lastid: -1
                })
                this.$store.commit("instrument/update_selected_instrument", {
                    name: "Belum Pilih Instrument"
                })
                this.$store.commit("qc/update_selected_qc", {
                    name: ""
                })
            }, 200),
            thr_search_company: _.debounce(function () {
                this.$store.dispatch("instrument/searchcompany", {
                    search: this.search_company
                })
            }, 200),
            thr_search_mou: _.debounce(function () {
                this.$store.dispatch("instrument/searchmou", {
                    search: this.search_mou,
                    id: this.xautocompany.M_CompanyID
                })
            }, 200),
            thr_search_doctor: _.debounce(function () {
                this.$store.dispatch("instrument/searchdoctor", {
                    search: this.search_doctor
                })
            }, 200),
            searchControl() {
                this.$store.dispatch("instrument/lookup", {
                    id: this.xcontrol.name === "Belum Pilih Control" ? "0" : this.$store.state.control.selected_control
                        .id,
                    search: this.xsearch,
                    current_page: 1,
                    lastid: -1
                })
            },
            doPrint() {
                console.log('doprint')
                this.printwidth = 1028
                this.printtitle = ""
                let instrument = one_instrument()
                var id = this.xid
                var d = new Date();
                var n = d.getTime()
                var rptname = 'control_price'
                var formatrpt = this.formatreport

                this.urlprint = "/birt/run?__report=report/one/md/" + rptname +
                    ".rptdesign&__format=" +
                    formatrpt + "&PInstrumentID=" + id + "&instrumentxname=" + instrument.Nat_InstrumentInstrumentname +
                    "&tm=" + n

                this.openprint = true
            },
            closePrint() {
                this.openprint = false
            },
            openFormInstrument(val) {
                this.xid = val
                this.$store.commit("instrument/update_orderinstruments", [])
                this.$store.commit("instrument/update_dialog_form_instrument", true)
            },
            editFormInstrument(val) {
                this.xid = val.id
                this.xname = val.Nat_InstrumentName
                this.xdescription = val.Nat_InstrumentDescription
                this.$store.commit("instrument/update_autocontrols", [{
                    Nat_QcControlID: val.Nat_QcControlID,
                    Nat_QcControlName: val.Nat_QcControlName
                }])
                this.$store.commit("instrument/update_autocontrol", {
                    Nat_QcControlID: val.Nat_QcControlID,
                    Nat_QcControlName: val.Nat_QcControlName
                })
                this.$store.commit("instrument/update_dialog_form_instrument", true)
            },
            checkError(value) {
                var errors = this.$store.state.instrument.errors
                if (errors.includes(value)) {
                    return true
                } else {
                    return false
                }
            },
            forgetAlertConfirmation() {
                this.$store.commit("instrument/update_no_save", 0)
                this.$store.commit("instrument/update_open_alert_confirmation", false)
            },
            closeAlertConfirmation() {
                this.$store.commit("instrument/update_open_alert_confirmation", false)
            },
            changeQc() {
                this.$store.commit("instrument/update_no_save", 1)
            },
            saveFormInstrument() {
                if (this.$refs.formcontrolinstrument.validate()) {
                    this.$store.dispatch("instrument/save", {
                        xid: this.xid,
                        controlid: this.$store.state.control.selected_control.id,
                        controlname: this.$store.state.control.selected_control.name,
                        instruments: this.xorderinstruments,
                        scontrol: this.$store.state.control.x_search,
                        sinstrument: this.xsearch
                    })
                }

            },
            simpanAll() {
                this.$store.dispatch("instrument/saveall", {
                    xid: this.xid,
                    controlid: this.$store.state.control.selected_control.id,
                    controlname: this.$store.state.control.selected_control.name,
                    instruments: this.$store.state.instrument.instruments,
                    scontrol: this.$store.state.control.x_search,
                    sinstrument: this.xsearch
                })

            },
            set_date2(x) {
                this.startdate = x.new_date
            },
            set_date3(x) {
                this.enddate = x.new_date
            },
            formatDate(date) {
                if (!date) return null

                const [year, month, day] = date.split('-')
                return `${day}-${month}-${year}`
            },
            deFormatedDate(date) {
                if (!date) return null

                const [day, month, year] = date.split('-')
                return `${year}-${month.padStart(2, '0')}-${day.padStart(2, '0')}`
            },
            updateAlert_success(val) {
                this.$store.commit("control/update_alert_success", val)
            },
            deleteFormInstrument(data) {
                this.xid = data.id

                this.msgalertinstrument = "Yakin, mau hapus instrument ini?"
                this.dialogdeletealertinstrument = true
            },
            closeDeleteAlertInstrument() {
                this.$store.dispatch("instrument/delete", {
                    xid: this.xid,
                    controlid: this.$store.state.control.selected_control.id,
                    controlname: this.$store.state.control.selected_control.name,
                    instrumentid: this.$store.state.instrument.selected_instrument.Nat_InstrumentID,
                    instrumentname: this.$store.state.instrument.selected_instrument.Nat_InstrumentName,
                    name: this.xname,
                    scontrol: this.$store.state.control.x_search,
                    sinstrument: this.xsearch
                })
                this.dialogdeletealertinstrument = false
            }
        },
        watch: {
            xsearch(val, old) {
                console.log(val)
                this.xsearch = val
                this.thr_search()

            },
            search_control(val, old) {
                if (val == old) return
                if (!val) return
                if (val.length < 1) return
                if (this.$store.state.instrument.update_autocomplete_status == 1) return
                this.thr_search_control()
            },
            search_instrument(val, old) {
                if (val == old) return
                if (!val) return
                if (val.length < 1) return
                if (this.$store.state.instrument.update_autocomplete_status == 1) return
                this.thr_search_instrument()
            },
            search_city(val, old) {
                if (val == old) return
                if (!val) return
                if (val.length < 1) return
                if (this.$store.state.instrument.update_autocomplete_status == 1) return
                this.thr_search_city()
            },
            search_district(val, old) {
                if (val == old) return
                if (!val) return
                if (val.length < 1) return
                if (this.$store.state.instrument.update_autocomplete_status == 1) return
                this.thr_search_district()
            },
            search_kelurahan(val, old) {
                if (val == old) return
                if (!val) return
                if (val.length < 1) return
                if (this.$store.state.instrument.update_autocomplete_status == 1) return
                this.thr_search_kelurahan()
            },
            search_company(val, old) {
                if (val == old) return
                if (!val) return
                if (val.length < 1) return
                if (this.$store.state.instrument.update_autocomplete_status == 1) return
                this.thr_search_company()
            },
            search_mou(val, old) {
                if (val == old) return
                if (!val) return
                if (val.length < 1) return
                if (this.$store.state.instrument.update_autocomplete_status == 1) return
                this.thr_search_mou()
            },
            search_doctor(val, old) {
                if (val == old) return
                if (!val) return
                if (val.length < 1) return
                if (this.$store.state.instrument.update_autocomplete_status == 1) return
                this.thr_search_doctor()
            }
        }
    }
</script>