
<template>
  <v-container fluid grid-list-md >
    <v-layout row wrap>
        
      <left-box></left-box>
      <right-box></right-box>
      
    </v-layout>
  </v-container>
</template>
<script>
module.exports = {
    components : {
	 'left-box' : httpVueLoader('./foTestLeft.vue'),
	 'right-box' : httpVueLoader('./foTestRight.vue'),
 }
}
</script>