<template>
    <v-app id="inspire">
        <one-navbar></one-navbar>
        <v-main>
            <quick-menu></quick-menu>
            <div class="pa-5 bg-primary-lighten mx-2 rounded-xl" style="height: 100%;">
                <one-filter></one-filter>
                <one-content></one-content>
            </div>
        </v-main>
    </v-app>
</template>

<script type="module">
    import NavbarComponent from "../../globalcomponent/one-navbar.vue";
    import QuickMenu from "../../globalcomponent/quick-menu.vue";
    import Content from "./content.vue";
    import Filter from "./filter.vue";
    export default {
        name: "Status Pasien",
        components: {
            "one-navbar": NavbarComponent,
            "quick-menu": QuickMenu,
            "one-content": Content,
            "one-filter": Filter,
        },
        mounted() {
            
        },
        data() {
            return {
                visible: false
            }
        },
        computed: {
            
        },
        methods: {
            
        },
    }
</script>