<template>
    <v-card>
        <v-row class="pa-5">
            <v-col cols="12">
                <v-row>
                    <v-spacer></v-spacer>
                    <v-col cols="auto" class="px-2">
                        <v-btn variant="tonal" class="text-body-1" @click="selfService">{{
                            $t('message.report.selfservice') }}</v-btn>
                    </v-col>
                    <v-col cols="auto" class="px-2">
                        <v-btn variant="tonal" class="text-body-1" @click="patientAddress">{{
                            $t('message.report.patientAddress') }}</v-btn>
                    </v-col>
                    <v-col cols="auto" class="px-2">
                        <v-btn variant="tonal" class="text-body-1" @click="senderAddress">{{
                            $t('message.report.senderAddress') }}</v-btn>
                    </v-col>
                </v-row>
            </v-col>
            <v-col cols="12">
                <v-card-text>
                    <object style="overflow: hidden;" width="100%" :height="xheight" :data="xurl"></object>
                </v-card-text>
                <!-- <v-card-text> -->
                <!-- <object style="overflow: hidden;" width="100%" :height="xheight" :data="xurl"></object> -->
                <!-- <one-dialog-print :title="printtitle" :width="printwidth" :height="550" :status="openprintnote"
                        :urlprint="urlprintnote" @close-dialog-print="openprintnote = false"></one-dialog-print> -->

                <!-- </v-card-text> -->
                <!-- <v-card-actions>
                    <v-spacer></v-spacer>

                    <v-btn color="primary" flat onClick="window.location.reload();" @click="savetutup()">
                        TUTUP
                    </v-btn>
                </v-card-actions> -->
            </v-col>
        </v-row>
    </v-card>
</template>

<script>
export default {
    name: "ReportComponent",
    data() {
        return {
            xheight: 800,

            printtitle: '',
            printwidth: '90%',
            urlprintnote: '',

            xurl: "http://riau/birt/run?__report=report/one/rekap/executive_summary_mcu_001.rptdesign&__format=pdf&PID=12&username=Administrator"
        };
    },
    methods: {
        selfService() {
            // Implementasi fungsi selfService
            console.log("Self Service button clicked");
        },
        patientAddress() {
            // Implementasi fungsi patientAddress
            console.log("Patient Address button clicked");
        },
        senderAddress() {
            // Implementasi fungsi senderAddress
            console.log("Sender Address button clicked");
        },
    },
};
</script>

<style scoped></style>